API fetch failed: failed to parse API response (status 200): {"status":true,"response_code":200,"response":{"data":{"customer_name":"DJB_Package 03","asset_floor_id":45526,"floor_map":null,"customer_id":42619,"fk_customers_equipment_mapping_id":1019726,"id":1050828,"traceid":1050828,"status":1,"serialnumber":"SLAUGHTER_HOUSE_E-FAN_01_10","barcode":"1050828","ble_id":"1050828","year_of_manufacturing":null,"mapping_status":1,"asset_reference_number":null,"criticality":"HIGH","is_loaner":0,"loaner_availability":0,"capacity_rating":"SIZE:400 MM","customers_locations_serialnumber_mapping_id":958308,"location_name":"CHANDRAWAL WTP","location_id":61913,"department_name":null,"building_name":"IDGAH UGR","floor_name":"SLAUGHTER HOUSE OLB","department_id":null,"building_id":40378,"floor_id":28222,"installation_date":null,"iot_device_mapped":0,"ticketcount":0,"schedulecount":0,"schedule_configured":null,"schedule_initiate":null,"selectmachineowner":null,"selectmachineownername":" ","equipments_model_id":259774,"contract_name":null,"contract_number":null,"i | Error: json: cannot unmarshal string into Go struct field AssetIDDetails.response.assetIDDeatails.customer_lattitude of type float64