API fetch failed: failed to parse API response (status 200): {"status":true,"response_code":200,"response":{"data":{"customer_name":"DJB_Package 04","asset_floor_id":45571,"floor_map":null,"customer_id":42779,"fk_customers_equipment_mapping_id":1020923,"id":1051980,"traceid":1051980,"status":1,"serialnumber":"MATA SUNDARI BPS_CHANGE OVER SWITCH_18","barcode":"1051980","ble_id":"1051980","year_of_manufacturing":null,"mapping_status":1,"asset_reference_number":null,"criticality":"HIGH","is_loaner":0,"loaner_availability":0,"capacity_rating":"RATING: 100 AMP","customers_locations_serialnumber_mapping_id":959504,"location_name":"WAZIRABAD WTP","location_id":62042,"department_name":null,"building_name":"RAMLEELA-1 UGR","floor_name":"MATA SUNDARI BPS","department_id":null,"building_id":40438,"floor_id":28249,"installation_date":null,"iot_device_mapped":0,"ticketcount":0,"schedulecount":0,"schedule_configured":null,"schedule_initiate":null,"selectmachineowner":null,"selectmachineownername":" ","equipments_model_id":258614,"contract_name":null,"contract | Error: json: cannot unmarshal string into Go struct field AssetIDDetails.response.assetIDDeatails.customer_lattitude of type float64